mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 205 ± N1 = 26188 206 ± N2 = 26747 155 ± Nbkgd1 = 3519 155 ± Nbkgd2 = 3468 0.0000070 ± md = 1.8642608 0.21 ± p = 0.22 0.000079 ± sigmap1 = 0.004174 67 ± xi = -0.1

= 77.9 2 2χ = 79.7, 1 2χ

Fit Parameters