mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 273 ± N1 = 50978 274 ± N2 = 51095 256 ± Nbkgd1 = 41785 257 ± Nbkgd2 = 42348 0.0000079 ± md = 1.8642724 0.014 ± p = 0.597 0.000057 ± sigmap1 = 0.006840 0.68 ± xi = -16.560

= 72.3 2 2χ = 63.1, 1 2χ

Fit Parameters