mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 228 ± N1 = 40705 228 ± N2 = 40680 206 ± Nbkgd1 = 31414 207 ± Nbkgd2 = 31744 0.0000065 ± md = 1.8642656 0.015 ± p = 0.503 0.000051 ± sigmap1 = 0.004359 0.73 ± xi = -9.278

= 68.1 2 2χ = 56.2, 1 2χ

Fit Parameters