mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π ^+ K^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 83 ± N1 = 3614 83 ± N2 = 3591 134 ± Nbkgd1 = 14803 133 ± Nbkgd2 = 14522 0.000027 ± md = 1.869086 0.021 ± p = 0.513 0.00030 ± sigmap1 = 0.00516 1.0 ± xi = -9.64

= 55.7 2 2χ = 52.2, 1 2χ

Fit Parameters