mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 170 ± N1 = 12871 171 ± N2 = 12974 258 ± Nbkgd1 = 50221 259 ± Nbkgd2 = 50716 0.000017 ± md = 1.869114 0.011 ± p = 0.513 0.00012 ± sigmap1 = 0.00459 0.56 ± xi = -10.107

= 66.7 2 2χ = 58.5, 1 2χ

Fit Parameters