mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π _SK

→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π _SK

→^-D

1

→^-D^{Fit Parameters} 86 ± N1 = 5906 87 ± N2 = 6043 72 ± Nbkgd1 = 3715 73 ± Nbkgd2 = 3720 0.000016 ± md = 1.869092 0.047 ± p = 0.607 0.000086 ± sigmap1 = 0.002390 2.3 ± xi = -11.65

= 56.5 2 2χ = 35.8, 1 2χ

Fit Parameters