mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 155 ± N1 = 8357 154 ± N2 = 8275 296 ± Nbkgd1 = 72222 295 ± Nbkgd2 = 71427 0.000021 ± md = 1.869068 0.0095 ± p = 0.5099 0.00022 ± sigmap1 = 0.00411 0.46 ± xi = -9.486

= 50.1 2 2χ = 37.7, 1 2χ

Fit Parameters