mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 284 ± N1 = 68151 286 ± N2 = 68805 159 ± Nbkgd1 = 12371 160 ± Nbkgd2 = 12513 0.0000055 ± md = 1.8646638 0.028 ± p = 0.939 0.000038 ± sigmap1 = 0.006277 1.4 ± xi = -45.91

= 113.6 2 2χ = 149.3, 1 2χ

Fit Parameters