mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 209 ± N1 = 42987 209 ± N2 = 43135 32 ± Nbkgd1 = 376 33 ± Nbkgd2 = 397 0.0000053 ± md = 1.8694049 0.000044 ± sigmap1 = 0.004166 3.9 ± xi = -26.49

= 54.2 2 2χ = 52.1, 1 2χ

Fit Parameters