mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 154 ± N1 = 19893 155 ± N2 = 20163 90 ± Nbkgd1 = 4335 91 ± Nbkgd2 = 4340 0.0000097 ± md = 1.8694279 0.043 ± p = 0.761 0.000054 ± sigmap1 = 0.004188 2.3 ± xi = -36.61

= 77.3 2 2χ = 42.2, 1 2χ

Fit Parameters