mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 127 ± N1 = 13629 127 ± N2 = 13581 70 ± Nbkgd1 = 2409 72 ± Nbkgd2 = 2493 0.000012 ± md = 1.869460 0.057 ± p = 0.789 0.000098 ± sigmap1 = 0.006427 3.1 ± xi = -45.09

= 70.8 2 2χ = 53.4, 1 2χ

Fit Parameters