mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 223 ± N1 = 47161 224 ± N2 = 47710 75 ± Nbkgd1 = 3114 75 ± Nbkgd2 = 3095 0.0000054 ± md = 1.8646106 0.053 ± p = 0.688 0.000039 ± sigmap1 = 0.004249 2.7 ± xi = -24.13

= 79.5 2 2χ = 79.7, 1 2χ

Fit Parameters