mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 155 ± N1 = 20615 157 ± N2 = 20898 90 ± Nbkgd1 = 4603 91 ± Nbkgd2 = 4609 0.0000068 ± md = 1.8694355 0.039 ± p = 0.770 0.000038 ± sigmap1 = 0.004254 2.0 ± xi = -37.18

= 81.5 2 2χ = 47.1, 1 2χ

Fit Parameters