mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D Fit Parameters 282 ± N1 = 70412 283 ± N2 = 71143 132 ± Nbkgd1 = 8352 133 ± Nbkgd2 = 8598 0.0000056 ± md = 1.8650470 0.030 ± p = 0.696 0.000036 ± sigmap1 = 0.006404 1.5 ± xi = -32.83

= 137.8 2 2χ = 104.5, 1 2χ

Fit Parameters