mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D Fit Parameters 117 ± N1 = 12914 117 ± N2 = 12912 41 ± Nbkgd1 = 1039 41 ± Nbkgd2 = 1024 0.0000098 ± md = 1.8697348 0.11 ± p = 0.78 0.000075 ± sigmap1 = 0.003814 4.6 ± xi = -18.61

= 50.4 2 2χ = 63.9, 1 2χ

Fit Parameters