mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D Fit Parameters 220 ± N1 = 46871 221 ± N2 = 47145 55 ± Nbkgd1 = 1652 56 ± Nbkgd2 = 1660 0.0000053 ± md = 1.8647756 0.89 ± p = 1.50 0.000038 ± sigmap1 = 0.003974 6.3 ± xi = -34.70

= 291.9 2 2χ = 300.7, 1 2χ

Fit Parameters