mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D Fit Parameters 116 ± N1 = 12820 116 ± N2 = 12820 43 ± Nbkgd1 = 1132 43 ± Nbkgd2 = 1115 0.000010 ± md = 1.869639 0.077 ± p = 0.504 0.000076 ± sigmap1 = 0.003854 3.9 ± xi = -15.00

= 36.3 2 2χ = 39.5, 1 2χ

Fit Parameters