mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D Fit Parameters 282 ± N1 = 69296 285 ± N2 = 70440 138 ± Nbkgd1 = 8870 140 ± Nbkgd2 = 8927 0.0000058 ± md = 1.8646270 0.033 ± p = 0.821 0.000038 ± sigmap1 = 0.006556 1.7 ± xi = -40.78

= 128.2 2 2χ = 120.0, 1 2χ

Fit Parameters