mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 152 ± N1 = 20571 152 ± N2 = 20636 71 ± Nbkgd1 = 2602 71 ± Nbkgd2 = 2559 0.0000096 ± md = 1.8694147 0.050 ± p = 0.505 0.000053 ± sigmap1 = 0.004463 2.8 ± xi = -21.39

= 88.1 2 2χ = 63.5, 1 2χ

Fit Parameters