mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D Fit Parameters 117 ± N1 = 12753 117 ± N2 = 12693 46 ± Nbkgd1 = 1298 48 ± Nbkgd2 = 1397 0.0000100 ± md = 1.8693722 0.065 ± p = 0.569 0.000076 ± sigmap1 = 0.003890 3.4 ± xi = -21.45

= 44.7 2 2χ = 50.1, 1 2χ

Fit Parameters