mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D Fit Parameters 118 ± N1 = 12916 116 ± N2 = 12727 48 ± Nbkgd1 = 1378 45 ± Nbkgd2 = 1220 0.000010 ± md = 1.869364 0.068 ± p = 0.436 0.000078 ± sigmap1 = 0.004082 3.6 ± xi = -13.72

= 84.7 2 2χ = 50.7, 1 2χ

Fit Parameters