mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D Fit Parameters 282 ± N1 = 69970 282 ± N2 = 70623 135 ± Nbkgd1 = 8683 133 ± Nbkgd2 = 8543 0.0000056 ± md = 1.8649276 0.034 ± p = 0.797 0.000037 ± sigmap1 = 0.006338 1.7 ± xi = -37.50

= 85.5 2 2χ = 120.0, 1 2χ

Fit Parameters