mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 152 ± N1 = 20826 153 ± N2 = 21177 68 ± Nbkgd1 = 2290 67 ± Nbkgd2 = 2266 0.0000092 ± md = 1.8697030 0.060 ± p = 0.712 0.000051 ± sigmap1 = 0.004261 3.1 ± xi = -31.54

= 59.0 2 2χ = 32.8, 1 2χ

Fit Parameters