mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D Fit Parameters 220 ± N1 = 46754 221 ± N2 = 47289 58 ± Nbkgd1 = 1911 58 ± Nbkgd2 = 1898 0.0000054 ± md = 1.8648439 0.065 ± p = 0.537 0.000037 ± sigmap1 = 0.004162 3.3 ± xi = -14.36

= 69.4 2 2χ = 69.3, 1 2χ

Fit Parameters