mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 260 ± N1 = 43978 235 ± N2 = 44429 197 ± Nbkgd1 = 196 154 ± Nbkgd2 = 165 0.0000048 ± md = 1.8696461 0.00010 ± sigmap1 = 0.00410 92 ± xi = -0.1

= 100.2 2 2χ = 72.2, 1 2χ

Fit Parameters