mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D Fit Parameters 219 ± N1 = 46839 221 ± N2 = 47368 56 ± Nbkgd1 = 1833 56 ± Nbkgd2 = 1824 0.0000052 ± md = 1.8649718 0.056 ± p = 0.436 0.000035 ± sigmap1 = 0.004178 2.9 ± xi = -7.93

= 124.6 2 2χ = 123.1, 1 2χ

Fit Parameters