mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^+ K^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 97 ± N1 = 9396 97 ± N2 = 9437 11 ± Nbkgd1 = 81 12 ± Nbkgd2 = 95 0.000011 ± md = 1.869739

0.12 ± p = 1.50 0.000099 ± sigmap1 = 0.004466 8.5 ± xi = -31.09

= 55.9 2 2χ = 109.0, 1 2χ

Fit Parameters