mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π _SK

→^-D

1

→^-D Fit Parameters 191 ± N1 = 36505 191 ± N2 = 36503 14 ± Nbkgd1 = 114 14 ± Nbkgd2 = 119 0.0000054 ± md = 1.8697563 0.0000073 ± sigmap1 = 0.0020000 5.4 ± xi = -15.16

= 293.9 2 2χ = 340.2, 1 2χ

Fit Parameters