mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 152 ± N1 = 21018 153 ± N2 = 21355 66 ± Nbkgd1 = 2100 65 ± Nbkgd2 = 2088 0.0000090 ± md = 1.8697743 0.089 ± p = 0.968 0.000050 ± sigmap1 = 0.004201 3.8 ± xi = -35.09

= 82.1 2 2χ = 47.3, 1 2χ

Fit Parameters