mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π _SK

→^-D

1

→^-D Fit Parameters 191 ± N1 = 36376 191 ± N2 = 36476 11 ± Nbkgd1 = 83 13 ± Nbkgd2 = 110 0.0000054 ± md = 1.8697352 0.0000038 ± sigmap1 = 0.0020000 6.1 ± xi = -7.44

= 338.4 2 2χ = 383.7, 1 2χ

Fit Parameters