mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D Fit Parameters 116 ± N1 = 12813 117 ± N2 = 12998 42 ± Nbkgd1 = 1059 40 ± Nbkgd2 = 1000 0.0000098 ± md = 1.8697344 0.12 ± p = 0.84 0.000075 ± sigmap1 = 0.003876 4.7 ± xi = -17.75

= 62.7 2 2χ = 70.9, 1 2χ

Fit Parameters