mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 153 ± N1 = 20485 153 ± N2 = 20583 76 ± Nbkgd1 = 2750 75 ± Nbkgd2 = 2667 0.0000097 ± md = 1.8698104 0.059 ± p = 0.778 0.000053 ± sigmap1 = 0.004441 3.0 ± xi = -35.30

= 52.0 2 2χ = 46.3, 1 2χ

Fit Parameters