mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D Fit Parameters 124 ± N1 = 13865 124 ± N2 = 13881 53 ± Nbkgd1 = 1355 56 ± Nbkgd2 = 1470 0.000012 ± md = 1.869502 0.095 ± p = 0.942 0.000087 ± sigmap1 = 0.006497 4.5 ± xi = -42.43

= 70.8 2 2χ = 73.1, 1 2χ

Fit Parameters